\begin{thebibliography}{100}
\urlstyle{rm}
\expandafter\ifx\csname url\endcsname\relax
  \def\url#1{\texttt{#1}}\fi
\expandafter\ifx\csname urlprefix\endcsname\relax\def\urlprefix{URL }\fi
\expandafter\ifx\csname doiprefix\endcsname\relax\def\doiprefix{DOI: }\fi
\providecommand{\bibinfo}[2]{#2}
\providecommand{\eprint}[2][]{\url{#2}}

\bibitem{yang2008finding}
\bibinfo{author}{Yang, K.}, \bibinfo{author}{Bai, H.}, \bibinfo{author}{Ouyang,
  Q.}, \bibinfo{author}{Lai, L.} \& \bibinfo{author}{Tang, C.}
\newblock \bibinfo{journal}{\bibinfo{title}{Finding multiple target optimal
  intervention in disease-related molecular network}}.
\newblock {\emph{\JournalTitle{Molecular systems biology}}}
  \textbf{\bibinfo{volume}{4}}, \bibinfo{pages}{228} (\bibinfo{year}{2008}).

\bibitem{dickson2004key}
\bibinfo{author}{Dickson, M.} \& \bibinfo{author}{Gagnon, J.~P.}
\newblock \bibinfo{journal}{\bibinfo{title}{Key factors in the rising cost of
  new drug discovery and development}}.
\newblock {\emph{\JournalTitle{Nature reviews Drug discovery}}}
  \textbf{\bibinfo{volume}{3}}, \bibinfo{pages}{417--429}
  (\bibinfo{year}{2004}).

\bibitem{lo2018machine}
\bibinfo{author}{Lo, Y.-C.}, \bibinfo{author}{Rensi, S.~E.},
  \bibinfo{author}{Torng, W.} \& \bibinfo{author}{Altman, R.~B.}
\newblock \bibinfo{journal}{\bibinfo{title}{Machine learning in
  chemoinformatics and drug discovery}}.
\newblock {\emph{\JournalTitle{Drug discovery today}}}
  \textbf{\bibinfo{volume}{23}}, \bibinfo{pages}{1538--1546}
  (\bibinfo{year}{2018}).

\bibitem{tanne2006pfizer}
\bibinfo{author}{Tanne, J.~H.}
\newblock \bibinfo{title}{Pfizer stops clinical trials of heart drug}
  (\bibinfo{year}{2006}).

\bibitem{forrest2008torcetrapib}
\bibinfo{author}{Forrest, M.~J.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Torcetrapib-induced blood pressure
  elevation is independent of cetp inhibition and is accompanied by increased
  circulating levels of aldosterone}}.
\newblock {\emph{\JournalTitle{British journal of pharmacology}}}
  \textbf{\bibinfo{volume}{154}}, \bibinfo{pages}{1465--1473}
  (\bibinfo{year}{2008}).

\bibitem{liebler2005elucidating}
\bibinfo{author}{Liebler, D.~C.} \& \bibinfo{author}{Guengerich, F.~P.}
\newblock \bibinfo{journal}{\bibinfo{title}{Elucidating mechanisms of
  drug-induced toxicity}}.
\newblock {\emph{\JournalTitle{Nature reviews Drug discovery}}}
  \textbf{\bibinfo{volume}{4}}, \bibinfo{pages}{410--420}
  (\bibinfo{year}{2005}).

\bibitem{fungal}
\bibinfo{author}{Horn, F.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Systems biology of fungal
  infection}}.
\newblock {\emph{\JournalTitle{Frontiers in microbiology}}}
  \textbf{\bibinfo{volume}{3}}, \bibinfo{pages}{108} (\bibinfo{year}{2012}).

\bibitem{hasin2017multi}
\bibinfo{author}{Hasin, Y.}, \bibinfo{author}{Seldin, M.} \&
  \bibinfo{author}{Lusis, A.}
\newblock \bibinfo{journal}{\bibinfo{title}{Multi-omics approaches to
  disease}}.
\newblock {\emph{\JournalTitle{Genome biology}}} \textbf{\bibinfo{volume}{18}},
  \bibinfo{pages}{1--15} (\bibinfo{year}{2017}).

\bibitem{arning2012genome}
\bibinfo{author}{Arning, A.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{A genome-wide association study
  identifies a gene network of adamts genes in the predisposition to pediatric
  stroke}}.
\newblock {\emph{\JournalTitle{Blood, The Journal of the American Society of
  Hematology}}} \textbf{\bibinfo{volume}{120}}, \bibinfo{pages}{5231--5236}
  (\bibinfo{year}{2012}).

\bibitem{laslo2008gene}
\bibinfo{author}{Laslo, P.}, \bibinfo{author}{Pongubala, J.~M.},
  \bibinfo{author}{Lancki, D.~W.} \& \bibinfo{author}{Singh, H.}
\newblock \bibinfo{title}{Gene regulatory networks directing myeloid and
  lymphoid cell fates within the immune system}.
\newblock In \emph{\bibinfo{booktitle}{Seminars in immunology}},
  vol.~\bibinfo{volume}{20}, \bibinfo{pages}{228--235}
  (\bibinfo{organization}{Elsevier}, \bibinfo{year}{2008}).

\bibitem{schadt2005integrative}
\bibinfo{author}{Schadt, E.~E.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{An integrative genomics approach to
  infer causal associations between gene expression and disease}}.
\newblock {\emph{\JournalTitle{Nature genetics}}}
  \textbf{\bibinfo{volume}{37}}, \bibinfo{pages}{710--717}
  (\bibinfo{year}{2005}).

\bibitem{wang2020integrative}
\bibinfo{author}{Wang, B.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Integrative omics approach to
  identifying genes associated with atrial fibrillation}}.
\newblock {\emph{\JournalTitle{Circulation research}}}
  \textbf{\bibinfo{volume}{126}}, \bibinfo{pages}{350--360}
  (\bibinfo{year}{2020}).

\bibitem{li2020multi}
\bibinfo{author}{Li, J.}, \bibinfo{author}{Lu, Q.} \& \bibinfo{author}{Wen, Y.}
\newblock \bibinfo{journal}{\bibinfo{title}{Multi-kernel linear mixed model
  with adaptive lasso for prediction analysis on high-dimensional multi-omics
  data}}.
\newblock {\emph{\JournalTitle{Bioinformatics}}} \textbf{\bibinfo{volume}{36}},
  \bibinfo{pages}{1785--1794} (\bibinfo{year}{2020}).

\bibitem{subramanian2015network}
\bibinfo{author}{Subramanian, N.}, \bibinfo{author}{Torabi-Parizi, P.},
  \bibinfo{author}{Gottschalk, R.~A.}, \bibinfo{author}{Germain, R.~N.} \&
  \bibinfo{author}{Dutta, B.}
\newblock \bibinfo{journal}{\bibinfo{title}{Network representations of immune
  system complexity}}.
\newblock {\emph{\JournalTitle{Wiley Interdisciplinary Reviews: Systems Biology
  and Medicine}}} \textbf{\bibinfo{volume}{7}}, \bibinfo{pages}{13--38}
  (\bibinfo{year}{2015}).

\bibitem{kitano2002computational}
\bibinfo{author}{Kitano, H.}
\newblock \bibinfo{journal}{\bibinfo{title}{Computational systems biology}}.
\newblock {\emph{\JournalTitle{Nature}}} \textbf{\bibinfo{volume}{420}},
  \bibinfo{pages}{206--210} (\bibinfo{year}{2002}).

\bibitem{ay2007drug}
\bibinfo{author}{AY, M.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Drug--target network}}.
\newblock {\emph{\JournalTitle{Nature biotechnology}}}
  \textbf{\bibinfo{volume}{25}}, \bibinfo{pages}{1119--1127}
  (\bibinfo{year}{2007}).

\bibitem{mage2017closed}
\bibinfo{author}{Mage, P.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Closed-loop control of circulating
  drug levels in live animals}}.
\newblock {\emph{\JournalTitle{Nature Biomedical Engineering}}}
  \textbf{\bibinfo{volume}{1}}, \bibinfo{pages}{1--10} (\bibinfo{year}{2017}).

\bibitem{algoul2011multi}
\bibinfo{author}{Algoul, S.}, \bibinfo{author}{Alam, M.~S.},
  \bibinfo{author}{Hossain, M.~A.} \& \bibinfo{author}{Majumder, M.}
\newblock \bibinfo{journal}{\bibinfo{title}{Multi-objective optimal
  chemotherapy control model for cancer treatment}}.
\newblock {\emph{\JournalTitle{Medical \& biological engineering \&
  computing}}} \textbf{\bibinfo{volume}{49}}, \bibinfo{pages}{51--65}
  (\bibinfo{year}{2011}).

\bibitem{taylor2009dynamic}
\bibinfo{author}{Taylor, I.~W.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Dynamic modularity in protein
  interaction networks predicts breast cancer outcome}}.
\newblock {\emph{\JournalTitle{Nature biotechnology}}}
  \textbf{\bibinfo{volume}{27}}, \bibinfo{pages}{199--204}
  (\bibinfo{year}{2009}).

\bibitem{zhao2012systems}
\bibinfo{author}{Zhao, S.} \& \bibinfo{author}{Iyengar, R.}
\newblock \bibinfo{journal}{\bibinfo{title}{Systems pharmacology: network
  analysis to identify multiscale mechanisms of drug action}}.
\newblock {\emph{\JournalTitle{Annual review of pharmacology and toxicology}}}
  \textbf{\bibinfo{volume}{52}}, \bibinfo{pages}{505--521}
  (\bibinfo{year}{2012}).

\bibitem{sharan2005conserved}
\bibinfo{author}{Sharan, R.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Conserved patterns of protein
  interaction in multiple species}}.
\newblock {\emph{\JournalTitle{Proceedings of the National Academy of
  Sciences}}} \textbf{\bibinfo{volume}{102}}, \bibinfo{pages}{1974--1979}
  (\bibinfo{year}{2005}).

\bibitem{durmucs2015review}
\bibinfo{author}{Durmu{\c{s}}, S.}, \bibinfo{author}{{\c{C}}ak{\i}r, T.},
  \bibinfo{author}{{\"O}zg{\"u}r, A.} \& \bibinfo{author}{Guthke, R.}
\newblock \bibinfo{journal}{\bibinfo{title}{A review on computational systems
  biology of pathogen--host interactions}}.
\newblock {\emph{\JournalTitle{Frontiers in microbiology}}}
  \textbf{\bibinfo{volume}{6}}, \bibinfo{pages}{235} (\bibinfo{year}{2015}).

\bibitem{xie2009drug}
\bibinfo{author}{Xie, L.}, \bibinfo{author}{Li, J.}, \bibinfo{author}{Xie, L.}
  \& \bibinfo{author}{Bourne, P.~E.}
\newblock \bibinfo{journal}{\bibinfo{title}{Drug discovery using chemical
  systems biology: identification of the protein-ligand binding network to
  explain the side effects of cetp inhibitors}}.
\newblock {\emph{\JournalTitle{PLoS Comput Biol}}}
  \textbf{\bibinfo{volume}{5}}, \bibinfo{pages}{e1000387}
  (\bibinfo{year}{2009}).

\bibitem{albert2007network}
\bibinfo{author}{Albert, R.}
\newblock \bibinfo{journal}{\bibinfo{title}{Network inference, analysis, and
  modeling in systems biology}}.
\newblock {\emph{\JournalTitle{The Plant Cell}}} \textbf{\bibinfo{volume}{19}},
  \bibinfo{pages}{3327--3338} (\bibinfo{year}{2007}).

\bibitem{langhauser2018diseasome}
\bibinfo{author}{Langhauser, F.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{A diseasome cluster-based drug
  repurposing of soluble guanylate cyclase activators from smooth muscle
  relaxation to direct neuroprotection}}.
\newblock {\emph{\JournalTitle{NPJ systems biology and applications}}}
  \textbf{\bibinfo{volume}{4}}, \bibinfo{pages}{1--13} (\bibinfo{year}{2018}).

\bibitem{menche2015uncovering}
\bibinfo{author}{Menche, J.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Uncovering disease-disease
  relationships through the incomplete interactome}}.
\newblock {\emph{\JournalTitle{Science}}} \textbf{\bibinfo{volume}{347}}
  (\bibinfo{year}{2015}).

\bibitem{hecker2009gene}
\bibinfo{author}{Hecker, M.}, \bibinfo{author}{Lambeck, S.},
  \bibinfo{author}{Toepfer, S.}, \bibinfo{author}{Van~Someren, E.} \&
  \bibinfo{author}{Guthke, R.}
\newblock \bibinfo{journal}{\bibinfo{title}{Gene regulatory network inference:
  data integration in dynamic models—a review}}.
\newblock {\emph{\JournalTitle{Biosystems}}} \textbf{\bibinfo{volume}{96}},
  \bibinfo{pages}{86--103} (\bibinfo{year}{2009}).

\bibitem{goh2007human}
\bibinfo{author}{Goh, K.-I.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{The human disease network}}.
\newblock {\emph{\JournalTitle{Proceedings of the National Academy of
  Sciences}}} \textbf{\bibinfo{volume}{104}}, \bibinfo{pages}{8685--8690}
  (\bibinfo{year}{2007}).

\bibitem{husmeier2003sensitivity}
\bibinfo{author}{Husmeier, D.}
\newblock \bibinfo{journal}{\bibinfo{title}{Sensitivity and specificity of
  inferring genetic regulatory interactions from microarray experiments with
  dynamic bayesian networks}}.
\newblock {\emph{\JournalTitle{Bioinformatics}}} \textbf{\bibinfo{volume}{19}},
  \bibinfo{pages}{2271--2282} (\bibinfo{year}{2003}).

\bibitem{meyer2009mathematical}
\bibinfo{author}{Meyer-Hermann, M.}, \bibinfo{author}{Figge, M.~T.} \&
  \bibinfo{author}{Straub, R.~H.}
\newblock \bibinfo{journal}{\bibinfo{title}{Mathematical modeling of the
  circadian rhythm of key neuroendocrine--immune system players in rheumatoid
  arthritis: A systems biology approach}}.
\newblock {\emph{\JournalTitle{Arthritis \& Rheumatism}}}
  \textbf{\bibinfo{volume}{60}}, \bibinfo{pages}{2585--2594}
  (\bibinfo{year}{2009}).

\bibitem{suthram2010network}
\bibinfo{author}{Suthram, S.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Network-based elucidation of human
  disease similarities reveals common functional modules enriched for
  pluripotent drug targets}}.
\newblock {\emph{\JournalTitle{PLoS Comput Biol}}}
  \textbf{\bibinfo{volume}{6}}, \bibinfo{pages}{e1000662}
  (\bibinfo{year}{2010}).

\bibitem{keiser2009predicting}
\bibinfo{author}{Keiser, M.~J.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Predicting new molecular targets
  for known drugs}}.
\newblock {\emph{\JournalTitle{Nature}}} \textbf{\bibinfo{volume}{462}},
  \bibinfo{pages}{175--181} (\bibinfo{year}{2009}).

\bibitem{wang2007cancer}
\bibinfo{author}{Wang, E.}, \bibinfo{author}{Lenferink, A.} \&
  \bibinfo{author}{O'Connor-McCourt, M.}
\newblock \bibinfo{journal}{\bibinfo{title}{Cancer systems biology: exploring
  cancer-associated genes on cellular networks}}.
\newblock {\emph{\JournalTitle{arXiv preprint arXiv:0712.3753}}}
  (\bibinfo{year}{2007}).

\bibitem{ma2015revealing}
\bibinfo{author}{Ma, X.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Revealing pathway dynamics in heart
  diseases by analyzing multiple differential networks}}.
\newblock {\emph{\JournalTitle{PLoS Comput Biol}}}
  \textbf{\bibinfo{volume}{11}}, \bibinfo{pages}{e1004332}
  (\bibinfo{year}{2015}).

\bibitem{bentele2004mathematical}
\bibinfo{author}{Bentele, M.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Mathematical modeling reveals
  threshold mechanism in cd95-induced apoptosis}}.
\newblock {\emph{\JournalTitle{The Journal of cell biology}}}
  \textbf{\bibinfo{volume}{166}}, \bibinfo{pages}{839--851}
  (\bibinfo{year}{2004}).

\bibitem{kolch2015dynamic}
\bibinfo{author}{Kolch, W.}, \bibinfo{author}{Halasz, M.},
  \bibinfo{author}{Granovskaya, M.} \& \bibinfo{author}{Kholodenko, B.~N.}
\newblock \bibinfo{journal}{\bibinfo{title}{The dynamic control of signal
  transduction networks in cancer cells}}.
\newblock {\emph{\JournalTitle{Nature Reviews Cancer}}}
  \textbf{\bibinfo{volume}{15}}, \bibinfo{pages}{515--527}
  (\bibinfo{year}{2015}).

\bibitem{lamb2006connectivity}
\bibinfo{author}{Lamb, J.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{The connectivity map: using
  gene-expression signatures to connect small molecules, genes, and disease}}.
\newblock {\emph{\JournalTitle{science}}} \textbf{\bibinfo{volume}{313}},
  \bibinfo{pages}{1929--1935} (\bibinfo{year}{2006}).

\bibitem{chicco2014deep}
\bibinfo{author}{Chicco, D.}, \bibinfo{author}{Sadowski, P.} \&
  \bibinfo{author}{Baldi, P.}
\newblock \bibinfo{title}{Deep autoencoder neural networks for gene ontology
  annotation predictions}.
\newblock In \emph{\bibinfo{booktitle}{Proceedings of the 5th ACM conference on
  bioinformatics, computational biology, and health informatics}},
  \bibinfo{pages}{533--540} (\bibinfo{year}{2014}).

\bibitem{singh2014gene}
\bibinfo{author}{Singh, H.}, \bibinfo{author}{Khan, A.~A.} \&
  \bibinfo{author}{Dinner, A.~R.}
\newblock \bibinfo{journal}{\bibinfo{title}{Gene regulatory networks in the
  immune system}}.
\newblock {\emph{\JournalTitle{Trends in immunology}}}
  \textbf{\bibinfo{volume}{35}}, \bibinfo{pages}{211--218}
  (\bibinfo{year}{2014}).

\bibitem{vitali2016network}
\bibinfo{author}{Vitali, F.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{A network-based data integration
  approach to support drug repurposing and multi-target therapies in triple
  negative breast cancer}}.
\newblock {\emph{\JournalTitle{PloS one}}} \textbf{\bibinfo{volume}{11}},
  \bibinfo{pages}{e0162407} (\bibinfo{year}{2016}).

\bibitem{califano2012leveraging}
\bibinfo{author}{Califano, A.}, \bibinfo{author}{Butte, A.~J.},
  \bibinfo{author}{Friend, S.}, \bibinfo{author}{Ideker, T.} \&
  \bibinfo{author}{Schadt, E.}
\newblock \bibinfo{journal}{\bibinfo{title}{Leveraging models of cell
  regulation and gwas data in integrative network-based association studies}}.
\newblock {\emph{\JournalTitle{Nature genetics}}}
  \textbf{\bibinfo{volume}{44}}, \bibinfo{pages}{841--847}
  (\bibinfo{year}{2012}).

\bibitem{joy2005high}
\bibinfo{author}{Joy, M.~P.}, \bibinfo{author}{Brock, A.},
  \bibinfo{author}{Ingber, D.~E.} \& \bibinfo{author}{Huang, S.}
\newblock \bibinfo{journal}{\bibinfo{title}{High-betweenness proteins in the
  yeast protein interaction network}}.
\newblock {\emph{\JournalTitle{Journal of Biomedicine and Biotechnology}}}
  \textbf{\bibinfo{volume}{2005}}, \bibinfo{pages}{96} (\bibinfo{year}{2005}).

\bibitem{roth2016systems}
\bibinfo{author}{Roth, W.}, \bibinfo{author}{Hecker, D.} \&
  \bibinfo{author}{Fava, E.}
\newblock \bibinfo{title}{Systems biology approaches to the study of biological
  networks underlying alzheimer’s disease: role of mirnas}.
\newblock In \emph{\bibinfo{booktitle}{Systems Biology of Alzheimer's
  Disease}}, \bibinfo{pages}{349--377} (\bibinfo{publisher}{Springer},
  \bibinfo{year}{2016}).

\bibitem{oti2006predicting}
\bibinfo{author}{Oti, M.}, \bibinfo{author}{Snel, B.}, \bibinfo{author}{Huynen,
  M.~A.} \& \bibinfo{author}{Brunner, H.~G.}
\newblock \bibinfo{journal}{\bibinfo{title}{Predicting disease genes using
  protein--protein interactions}}.
\newblock {\emph{\JournalTitle{Journal of medical genetics}}}
  \textbf{\bibinfo{volume}{43}}, \bibinfo{pages}{691--698}
  (\bibinfo{year}{2006}).

\bibitem{cui2009uncovering}
\bibinfo{author}{Cui, T.}, \bibinfo{author}{Zhang, L.}, \bibinfo{author}{Wang,
  X.} \& \bibinfo{author}{He, Z.-G.}
\newblock \bibinfo{journal}{\bibinfo{title}{Uncovering new signaling proteins
  and potential drug targets through the interactome analysis of mycobacterium
  tuberculosis}}.
\newblock {\emph{\JournalTitle{BMC genomics}}} \textbf{\bibinfo{volume}{10}},
  \bibinfo{pages}{118} (\bibinfo{year}{2009}).

\bibitem{dutta2020stabilizing}
\bibinfo{author}{Dutta, A.}
\newblock \bibinfo{title}{Stabilizing covid-19 infections in us by feedback
  control based test and quarantine}.
\newblock In \emph{\bibinfo{booktitle}{2020 IEEE Global Humanitarian Technology
  Conference (GHTC)}}, \bibinfo{pages}{1--6} (\bibinfo{organization}{IEEE},
  \bibinfo{year}{2020}).

\bibitem{messina2020covid}
\bibinfo{author}{Messina, F.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Covid-19: viral--host interactome
  analyzed by network based-approach model to study pathogenesis of sars-cov-2
  infection}}.
\newblock {\emph{\JournalTitle{Journal of Translational Medicine}}}
  \textbf{\bibinfo{volume}{18}}, \bibinfo{pages}{1--10} (\bibinfo{year}{2020}).

\bibitem{zhavoronkov2014signaling}
\bibinfo{author}{Zhavoronkov, A.}, \bibinfo{author}{Buzdin, A.~A.},
  \bibinfo{author}{Garazha, A.~V.}, \bibinfo{author}{Borissoff, N.} \&
  \bibinfo{author}{Moskalev, A.~A.}
\newblock \bibinfo{journal}{\bibinfo{title}{Signaling pathway cloud regulation
  for in silico screening and ranking of the potential geroprotective drugs}}.
\newblock {\emph{\JournalTitle{Frontiers in genetics}}}
  \textbf{\bibinfo{volume}{5}}, \bibinfo{pages}{49} (\bibinfo{year}{2014}).

\bibitem{smyth2005limma}
\bibinfo{author}{Smyth, G.~K.}
\newblock \bibinfo{title}{Limma: linear models for microarray data}.
\newblock In \emph{\bibinfo{booktitle}{Bioinformatics and computational biology
  solutions using R and Bioconductor}}, \bibinfo{pages}{397--420}
  (\bibinfo{publisher}{Springer}, \bibinfo{year}{2005}).

\bibitem{quan2015protein}
\bibinfo{author}{Quan, Z.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Protein-protein interaction network
  and mechanism analysis in ischemic stroke}}.
\newblock {\emph{\JournalTitle{Molecular medicine reports}}}
  \textbf{\bibinfo{volume}{11}}, \bibinfo{pages}{29--36}
  (\bibinfo{year}{2015}).

\bibitem{zhang2005general}
\bibinfo{author}{Zhang, B.} \& \bibinfo{author}{Horvath, S.}
\newblock \bibinfo{journal}{\bibinfo{title}{A general framework for weighted
  gene co-expression network analysis}}.
\newblock {\emph{\JournalTitle{Statistical applications in genetics and
  molecular biology}}} \textbf{\bibinfo{volume}{4}} (\bibinfo{year}{2005}).

\bibitem{langfelder2008wgcna}
\bibinfo{author}{Langfelder, P.} \& \bibinfo{author}{Horvath, S.}
\newblock \bibinfo{journal}{\bibinfo{title}{Wgcna: an r package for weighted
  correlation network analysis}}.
\newblock {\emph{\JournalTitle{BMC bioinformatics}}}
  \textbf{\bibinfo{volume}{9}}, \bibinfo{pages}{1--13} (\bibinfo{year}{2008}).

\bibitem{karp2016pathway}
\bibinfo{author}{Karp, P.~D.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Pathway tools version 19.0 update:
  software for pathway/genome informatics and systems biology}}.
\newblock {\emph{\JournalTitle{Briefings in bioinformatics}}}
  \textbf{\bibinfo{volume}{17}}, \bibinfo{pages}{877--890}
  (\bibinfo{year}{2016}).

\bibitem{zhang2015predicting}
\bibinfo{author}{Zhang, N.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Predicting anticancer drug
  responses using a dual-layer integrated cell line-drug network model}}.
\newblock {\emph{\JournalTitle{PLoS Comput Biol}}}
  \textbf{\bibinfo{volume}{11}}, \bibinfo{pages}{e1004498}
  (\bibinfo{year}{2015}).

\bibitem{cheng2018network}
\bibinfo{author}{Cheng, F.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Network-based approach to
  prediction and population-based validation of in silico drug repurposing}}.
\newblock {\emph{\JournalTitle{Nature communications}}}
  \textbf{\bibinfo{volume}{9}}, \bibinfo{pages}{1--12} (\bibinfo{year}{2018}).

\bibitem{lounkine2012large}
\bibinfo{author}{Lounkine, E.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Large-scale prediction and testing
  of drug activity on side-effect targets}}.
\newblock {\emph{\JournalTitle{Nature}}} \textbf{\bibinfo{volume}{486}},
  \bibinfo{pages}{361--367} (\bibinfo{year}{2012}).

\bibitem{tang2013target}
\bibinfo{author}{Tang, J.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Target inhibition networks:
  predicting selective combinations of druggable targets to block cancer
  survival pathways}}.
\newblock {\emph{\JournalTitle{PLoS Comput Biol}}}
  \textbf{\bibinfo{volume}{9}}, \bibinfo{pages}{e1003226}
  (\bibinfo{year}{2013}).

\bibitem{yamanishi2008prediction}
\bibinfo{author}{Yamanishi, Y.}, \bibinfo{author}{Araki, M.},
  \bibinfo{author}{Gutteridge, A.}, \bibinfo{author}{Honda, W.} \&
  \bibinfo{author}{Kanehisa, M.}
\newblock \bibinfo{journal}{\bibinfo{title}{Prediction of drug--target
  interaction networks from the integration of chemical and genomic spaces}}.
\newblock {\emph{\JournalTitle{Bioinformatics}}} \textbf{\bibinfo{volume}{24}},
  \bibinfo{pages}{i232--i240} (\bibinfo{year}{2008}).

\bibitem{tatonetti2012novel}
\bibinfo{author}{Tatonetti, N.~P.}, \bibinfo{author}{Fernald, G.~H.} \&
  \bibinfo{author}{Altman, R.~B.}
\newblock \bibinfo{journal}{\bibinfo{title}{A novel signal detection algorithm
  for identifying hidden drug-drug interactions in adverse event reports}}.
\newblock {\emph{\JournalTitle{Journal of the American Medical Informatics
  Association}}} \textbf{\bibinfo{volume}{19}}, \bibinfo{pages}{79--85}
  (\bibinfo{year}{2012}).

\bibitem{liu2016drug}
\bibinfo{author}{Liu, S.}, \bibinfo{author}{Tang, B.}, \bibinfo{author}{Chen,
  Q.} \& \bibinfo{author}{Wang, X.}
\newblock \bibinfo{journal}{\bibinfo{title}{Drug-drug interaction extraction
  via convolutional neural networks}}.
\newblock {\emph{\JournalTitle{Computational and mathematical methods in
  medicine}}} \textbf{\bibinfo{volume}{2016}} (\bibinfo{year}{2016}).

\bibitem{wu2017sdtnbi}
\bibinfo{author}{Wu, Z.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Sdtnbi: an integrated network and
  chemoinformatics tool for systematic prediction of drug--target interactions
  and drug repositioning}}.
\newblock {\emph{\JournalTitle{Briefings in bioinformatics}}}
  \textbf{\bibinfo{volume}{18}}, \bibinfo{pages}{333--347}
  (\bibinfo{year}{2017}).

\bibitem{wang2014similarity}
\bibinfo{author}{Wang, B.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Similarity network fusion for
  aggregating data types on a genomic scale}}.
\newblock {\emph{\JournalTitle{Nature methods}}} \textbf{\bibinfo{volume}{11}},
  \bibinfo{pages}{333} (\bibinfo{year}{2014}).

\bibitem{morris2011training}
\bibinfo{author}{Morris, M.~K.}, \bibinfo{author}{Saez-Rodriguez, J.},
  \bibinfo{author}{Clarke, D.~C.}, \bibinfo{author}{Sorger, P.~K.} \&
  \bibinfo{author}{Lauffenburger, D.~A.}
\newblock \bibinfo{journal}{\bibinfo{title}{Training signaling pathway maps to
  biochemical data with constrained fuzzy logic: quantitative analysis of liver
  cell responses to inflammatory stimuli}}.
\newblock {\emph{\JournalTitle{PLoS Comput Biol}}}
  \textbf{\bibinfo{volume}{7}}, \bibinfo{pages}{e1001099}
  (\bibinfo{year}{2011}).

\bibitem{bleakley2007supervised}
\bibinfo{author}{Bleakley, K.}, \bibinfo{author}{Biau, G.} \&
  \bibinfo{author}{Vert, J.-P.}
\newblock \bibinfo{journal}{\bibinfo{title}{Supervised reconstruction of
  biological networks with local models}}.
\newblock {\emph{\JournalTitle{Bioinformatics}}} \textbf{\bibinfo{volume}{23}},
  \bibinfo{pages}{i57--i65} (\bibinfo{year}{2007}).

\bibitem{fakhraei2014network}
\bibinfo{author}{Fakhraei, S.}, \bibinfo{author}{Huang, B.},
  \bibinfo{author}{Raschid, L.} \& \bibinfo{author}{Getoor, L.}
\newblock \bibinfo{journal}{\bibinfo{title}{Network-based drug-target
  interaction prediction with probabilistic soft logic}}.
\newblock {\emph{\JournalTitle{IEEE/ACM Transactions on Computational Biology
  and Bioinformatics}}} \textbf{\bibinfo{volume}{11}},
  \bibinfo{pages}{775--787} (\bibinfo{year}{2014}).

\bibitem{kadurin2017drugan}
\bibinfo{author}{Kadurin, A.}, \bibinfo{author}{Nikolenko, S.},
  \bibinfo{author}{Khrabrov, K.}, \bibinfo{author}{Aliper, A.} \&
  \bibinfo{author}{Zhavoronkov, A.}
\newblock \bibinfo{journal}{\bibinfo{title}{drugan: an advanced generative
  adversarial autoencoder model for de novo generation of new molecules with
  desired molecular properties in silico}}.
\newblock {\emph{\JournalTitle{Molecular pharmaceutics}}}
  \textbf{\bibinfo{volume}{14}}, \bibinfo{pages}{3098--3104}
  (\bibinfo{year}{2017}).

\bibitem{yadav2014quantitative}
\bibinfo{author}{Yadav, B.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Quantitative scoring of
  differential drug sensitivity for individually optimized anticancer
  therapies}}.
\newblock {\emph{\JournalTitle{Scientific reports}}}
  \textbf{\bibinfo{volume}{4}}, \bibinfo{pages}{5193} (\bibinfo{year}{2014}).

\bibitem{wang2018computational}
\bibinfo{author}{Wang, L.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{A computational-based method for
  predicting drug--target interactions by using stacked autoencoder deep neural
  network}}.
\newblock {\emph{\JournalTitle{Journal of Computational Biology}}}
  \textbf{\bibinfo{volume}{25}}, \bibinfo{pages}{361--373}
  (\bibinfo{year}{2018}).

\bibitem{blaschke2018application}
\bibinfo{author}{Blaschke, T.}, \bibinfo{author}{Olivecrona, M.},
  \bibinfo{author}{Engkvist, O.}, \bibinfo{author}{Bajorath, J.} \&
  \bibinfo{author}{Chen, H.}
\newblock \bibinfo{journal}{\bibinfo{title}{Application of generative
  autoencoder in de novo molecular design}}.
\newblock {\emph{\JournalTitle{Molecular informatics}}}
  \textbf{\bibinfo{volume}{37}}, \bibinfo{pages}{1700123}
  (\bibinfo{year}{2018}).

\bibitem{nakaya2011systems}
\bibinfo{author}{Nakaya, H.~I.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Systems biology of vaccination for
  seasonal influenza in humans}}.
\newblock {\emph{\JournalTitle{Nature immunology}}}
  \textbf{\bibinfo{volume}{12}}, \bibinfo{pages}{786} (\bibinfo{year}{2011}).

\bibitem{campillos2008drug}
\bibinfo{author}{Campillos, M.}, \bibinfo{author}{Kuhn, M.},
  \bibinfo{author}{Gavin, A.-C.}, \bibinfo{author}{Jensen, L.~J.} \&
  \bibinfo{author}{Bork, P.}
\newblock \bibinfo{journal}{\bibinfo{title}{Drug target identification using
  side-effect similarity}}.
\newblock {\emph{\JournalTitle{Science}}} \textbf{\bibinfo{volume}{321}},
  \bibinfo{pages}{263--266} (\bibinfo{year}{2008}).

\bibitem{napolitano2013drug}
\bibinfo{author}{Napolitano, F.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Drug repositioning: a
  machine-learning approach through data integration}}.
\newblock {\emph{\JournalTitle{Journal of cheminformatics}}}
  \textbf{\bibinfo{volume}{5}}, \bibinfo{pages}{30} (\bibinfo{year}{2013}).

\bibitem{wang2008clustering}
\bibinfo{author}{Wang, R.-S.}, \bibinfo{author}{Zhang, S.},
  \bibinfo{author}{Wang, Y.}, \bibinfo{author}{Zhang, X.-S.} \&
  \bibinfo{author}{Chen, L.}
\newblock \bibinfo{journal}{\bibinfo{title}{Clustering complex networks and
  biological networks by nonnegative matrix factorization with various
  similarity measures}}.
\newblock {\emph{\JournalTitle{Neurocomputing}}} \textbf{\bibinfo{volume}{72}},
  \bibinfo{pages}{134--141} (\bibinfo{year}{2008}).

\bibitem{navlakha2010power}
\bibinfo{author}{Navlakha, S.} \& \bibinfo{author}{Kingsford, C.}
\newblock \bibinfo{journal}{\bibinfo{title}{The power of protein interaction
  networks for associating genes with diseases}}.
\newblock {\emph{\JournalTitle{Bioinformatics}}} \textbf{\bibinfo{volume}{26}},
  \bibinfo{pages}{1057--1063} (\bibinfo{year}{2010}).

\bibitem{kyrtsos2011systems}
\bibinfo{author}{Kyrtsos, C.~R.} \& \bibinfo{author}{Baras, J.~S.}
\newblock \bibinfo{title}{A systems biology model studying the role of
  cholesterol in alzheimer's disease progression}.
\newblock In \emph{\bibinfo{booktitle}{2011 10th International Workshop on
  Biomedical Engineering}}, \bibinfo{pages}{1--7}
  (\bibinfo{organization}{IEEE}, \bibinfo{year}{2011}).

\bibitem{chen2009input}
\bibinfo{author}{Chen, W.~W.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Input--output behavior of erbb
  signaling pathways as revealed by a mass action model trained against dynamic
  data}}.
\newblock {\emph{\JournalTitle{Molecular systems biology}}}
  \textbf{\bibinfo{volume}{5}}, \bibinfo{pages}{239} (\bibinfo{year}{2009}).

\bibitem{cheng2014machine}
\bibinfo{author}{Cheng, F.} \& \bibinfo{author}{Zhao, Z.}
\newblock \bibinfo{journal}{\bibinfo{title}{Machine learning-based prediction
  of drug--drug interactions by integrating drug phenotypic, therapeutic,
  chemical, and genomic properties}}.
\newblock {\emph{\JournalTitle{Journal of the American Medical Informatics
  Association}}} \textbf{\bibinfo{volume}{21}}, \bibinfo{pages}{e278--e286}
  (\bibinfo{year}{2014}).

\bibitem{cheng2012prediction}
\bibinfo{author}{Cheng, F.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Prediction of drug-target
  interactions and drug repositioning via network-based inference}}.
\newblock {\emph{\JournalTitle{PLoS Comput Biol}}}
  \textbf{\bibinfo{volume}{8}}, \bibinfo{pages}{e1002503}
  (\bibinfo{year}{2012}).

\bibitem{ye2014construction}
\bibinfo{author}{Ye, H.}, \bibinfo{author}{Liu, Q.} \& \bibinfo{author}{Wei,
  J.}
\newblock \bibinfo{journal}{\bibinfo{title}{Construction of drug network based
  on side effects and its application for drug repositioning}}.
\newblock {\emph{\JournalTitle{PloS one}}} \textbf{\bibinfo{volume}{9}},
  \bibinfo{pages}{e87864} (\bibinfo{year}{2014}).

\bibitem{ding2019identification}
\bibinfo{author}{Ding, Y.}, \bibinfo{author}{Tang, J.} \& \bibinfo{author}{Guo,
  F.}
\newblock \bibinfo{journal}{\bibinfo{title}{Identification of drug-side effect
  association via multiple information integration with centered kernel
  alignment}}.
\newblock {\emph{\JournalTitle{Neurocomputing}}}
  \textbf{\bibinfo{volume}{325}}, \bibinfo{pages}{211--224}
  (\bibinfo{year}{2019}).

\bibitem{huang2017more}
\bibinfo{author}{Huang, S.}, \bibinfo{author}{Chaudhary, K.} \&
  \bibinfo{author}{Garmire, L.~X.}
\newblock \bibinfo{journal}{\bibinfo{title}{More is better: recent progress in
  multi-omics data integration methods}}.
\newblock {\emph{\JournalTitle{Frontiers in genetics}}}
  \textbf{\bibinfo{volume}{8}}, \bibinfo{pages}{84} (\bibinfo{year}{2017}).

\bibitem{ding2014similarity}
\bibinfo{author}{Ding, H.}, \bibinfo{author}{Takigawa, I.},
  \bibinfo{author}{Mamitsuka, H.} \& \bibinfo{author}{Zhu, S.}
\newblock \bibinfo{journal}{\bibinfo{title}{Similarity-based machine learning
  methods for predicting drug--target interactions: a brief review}}.
\newblock {\emph{\JournalTitle{Briefings in bioinformatics}}}
  \textbf{\bibinfo{volume}{15}}, \bibinfo{pages}{734--747}
  (\bibinfo{year}{2014}).

\bibitem{mordelet2008sirene}
\bibinfo{author}{Mordelet, F.} \& \bibinfo{author}{Vert, J.-P.}
\newblock \bibinfo{journal}{\bibinfo{title}{Sirene: supervised inference of
  regulatory networks}}.
\newblock {\emph{\JournalTitle{Bioinformatics}}} \textbf{\bibinfo{volume}{24}},
  \bibinfo{pages}{i76--i82} (\bibinfo{year}{2008}).

\bibitem{bleakley2009supervised}
\bibinfo{author}{Bleakley, K.} \& \bibinfo{author}{Yamanishi, Y.}
\newblock \bibinfo{journal}{\bibinfo{title}{Supervised prediction of
  drug--target interactions using bipartite local models}}.
\newblock {\emph{\JournalTitle{Bioinformatics}}} \textbf{\bibinfo{volume}{25}},
  \bibinfo{pages}{2397--2403} (\bibinfo{year}{2009}).

\bibitem{chen2018rise}
\bibinfo{author}{Chen, H.}, \bibinfo{author}{Engkvist, O.},
  \bibinfo{author}{Wang, Y.}, \bibinfo{author}{Olivecrona, M.} \&
  \bibinfo{author}{Blaschke, T.}
\newblock \bibinfo{journal}{\bibinfo{title}{The rise of deep learning in drug
  discovery}}.
\newblock {\emph{\JournalTitle{Drug discovery today}}}
  \textbf{\bibinfo{volume}{23}}, \bibinfo{pages}{1241--1250}
  (\bibinfo{year}{2018}).

\bibitem{stepniewska2018development}
\bibinfo{author}{Stepniewska-Dziubinska, M.~M.},
  \bibinfo{author}{Zielenkiewicz, P.} \& \bibinfo{author}{Siedlecki, P.}
\newblock \bibinfo{journal}{\bibinfo{title}{Development and evaluation of a
  deep learning model for protein--ligand binding affinity prediction}}.
\newblock {\emph{\JournalTitle{Bioinformatics}}} \textbf{\bibinfo{volume}{34}},
  \bibinfo{pages}{3666--3674} (\bibinfo{year}{2018}).

\bibitem{gawehn2018advancing}
\bibinfo{author}{Gawehn, E.}, \bibinfo{author}{Hiss, J.~A.},
  \bibinfo{author}{Brown, J.~B.} \& \bibinfo{author}{Schneider, G.}
\newblock \bibinfo{title}{Advancing drug discovery via gpu-based deep learning}
  (\bibinfo{year}{2018}).

\bibitem{duvenaud2015convolutional}
\bibinfo{author}{Duvenaud, D.~K.} \emph{et~al.}
\newblock \bibinfo{title}{Convolutional networks on graphs for learning
  molecular fingerprints}.
\newblock In \emph{\bibinfo{booktitle}{Advances in neural information
  processing systems}}, \bibinfo{pages}{2224--2232} (\bibinfo{year}{2015}).

\bibitem{eraslan2019single}
\bibinfo{author}{Eraslan, G.}, \bibinfo{author}{Simon, L.~M.},
  \bibinfo{author}{Mircea, M.}, \bibinfo{author}{Mueller, N.~S.} \&
  \bibinfo{author}{Theis, F.~J.}
\newblock \bibinfo{journal}{\bibinfo{title}{Single-cell rna-seq denoising using
  a deep count autoencoder}}.
\newblock {\emph{\JournalTitle{Nature communications}}}
  \textbf{\bibinfo{volume}{10}}, \bibinfo{pages}{1--14} (\bibinfo{year}{2019}).

\bibitem{geddes2019autoencoder}
\bibinfo{author}{Geddes, T.~A.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Autoencoder-based cluster ensembles
  for single-cell rna-seq data analysis}}.
\newblock {\emph{\JournalTitle{BMC bioinformatics}}}
  \textbf{\bibinfo{volume}{20}}, \bibinfo{pages}{660} (\bibinfo{year}{2019}).

\bibitem{chen2018bnpmda}
\bibinfo{author}{Chen, X.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Bnpmda: bipartite network
  projection for mirna--disease association prediction}}.
\newblock {\emph{\JournalTitle{Bioinformatics}}} \textbf{\bibinfo{volume}{34}},
  \bibinfo{pages}{3178--3186} (\bibinfo{year}{2018}).

\bibitem{miura2020verification}
\bibinfo{author}{Miura, M.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Verification of a cocktail approach
  for quantitative drug--drug interaction assessment: a comparative analysis
  between the results of a single drug and a cocktail drug}}.
\newblock {\emph{\JournalTitle{Xenobiotica}}} \bibinfo{pages}{1--29}
  (\bibinfo{year}{2020}).

\bibitem{villoslada2009systems}
\bibinfo{author}{Villoslada, P.}, \bibinfo{author}{Steinman, L.} \&
  \bibinfo{author}{Baranzini, S.~E.}
\newblock \bibinfo{journal}{\bibinfo{title}{Systems biology and its application
  to the understanding of neurological diseases}}.
\newblock {\emph{\JournalTitle{Annals of Neurology: Official Journal of the
  American Neurological Association and the Child Neurology Society}}}
  \textbf{\bibinfo{volume}{65}}, \bibinfo{pages}{124--139}
  (\bibinfo{year}{2009}).

\bibitem{grechkin2016identifying}
\bibinfo{author}{Grechkin, M.}, \bibinfo{author}{Logsdon, B.~A.},
  \bibinfo{author}{Gentles, A.~J.} \& \bibinfo{author}{Lee, S.-I.}
\newblock \bibinfo{journal}{\bibinfo{title}{Identifying network perturbation in
  cancer}}.
\newblock {\emph{\JournalTitle{PLoS computational biology}}}
  \textbf{\bibinfo{volume}{12}}, \bibinfo{pages}{e1004888}
  (\bibinfo{year}{2016}).

\bibitem{luo2012hiv}
\bibinfo{author}{Luo, R.}, \bibinfo{author}{Piovoso, M.~J.},
  \bibinfo{author}{Martinez-Picado, J.} \& \bibinfo{author}{Zurakowski, R.}
\newblock \bibinfo{journal}{\bibinfo{title}{Hiv model parameter estimates from
  interruption trial data including drug efficacy and reservoir dynamics}}.
\newblock {\emph{\JournalTitle{PloS one}}} \textbf{\bibinfo{volume}{7}},
  \bibinfo{pages}{e40198} (\bibinfo{year}{2012}).

\bibitem{lee2013identification}
\bibinfo{author}{Lee, M.~N.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Identification of regulators of the
  innate immune response to cytosolic dna and retroviral infection by an
  integrative approach}}.
\newblock {\emph{\JournalTitle{Nature immunology}}}
  \textbf{\bibinfo{volume}{14}}, \bibinfo{pages}{179--185}
  (\bibinfo{year}{2013}).

\bibitem{sever2015signal}
\bibinfo{author}{Sever, R.} \& \bibinfo{author}{Brugge, J.~S.}
\newblock \bibinfo{journal}{\bibinfo{title}{Signal transduction in cancer}}.
\newblock {\emph{\JournalTitle{Cold Spring Harbor perspectives in medicine}}}
  \textbf{\bibinfo{volume}{5}}, \bibinfo{pages}{a006098}
  (\bibinfo{year}{2015}).

\bibitem{cho2003analysis}
\bibinfo{author}{Cho, K.-H.} \& \bibinfo{author}{Wolkenhauer, O.}
\newblock \bibinfo{title}{Analysis and modelling of signal transduction
  pathways in systems biology} (\bibinfo{year}{2003}).

\bibitem{moles2003parameter}
\bibinfo{author}{Moles, C.~G.}, \bibinfo{author}{Mendes, P.} \&
  \bibinfo{author}{Banga, J.~R.}
\newblock \bibinfo{journal}{\bibinfo{title}{Parameter estimation in biochemical
  pathways: a comparison of global optimization methods}}.
\newblock {\emph{\JournalTitle{Genome research}}}
  \textbf{\bibinfo{volume}{13}}, \bibinfo{pages}{2467--2474}
  (\bibinfo{year}{2003}).

\bibitem{culshaw2004optimal}
\bibinfo{author}{Culshaw, R.~V.}, \bibinfo{author}{Ruan, S.} \&
  \bibinfo{author}{Spiteri, R.~J.}
\newblock \bibinfo{journal}{\bibinfo{title}{Optimal hiv treatment by maximising
  immune response}}.
\newblock {\emph{\JournalTitle{Journal of Mathematical Biology}}}
  \textbf{\bibinfo{volume}{48}}, \bibinfo{pages}{545--562}
  (\bibinfo{year}{2004}).

\bibitem{dalle2014dynamic}
\bibinfo{author}{Dalle~Pezze, P.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Dynamic modelling of pathways to
  cellular senescence reveals strategies for targeted interventions}}.
\newblock {\emph{\JournalTitle{PLoS Comput Biol}}}
  \textbf{\bibinfo{volume}{10}}, \bibinfo{pages}{e1003728}
  (\bibinfo{year}{2014}).

\bibitem{de2007chemotherapy}
\bibinfo{author}{de~Pillis, L.~G.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Chemotherapy for tumors: An
  analysis of the dynamics and a study of quadratic and linear optimal
  controls}}.
\newblock {\emph{\JournalTitle{Mathematical Biosciences}}}
  \textbf{\bibinfo{volume}{209}}, \bibinfo{pages}{292--315}
  (\bibinfo{year}{2007}).

\bibitem{zi2006sbml}
\bibinfo{author}{Zi, Z.} \& \bibinfo{author}{Klipp, E.}
\newblock \bibinfo{journal}{\bibinfo{title}{Sbml-pet: a systems biology markup
  language-based parameter estimation tool}}.
\newblock {\emph{\JournalTitle{Bioinformatics}}} \textbf{\bibinfo{volume}{22}},
  \bibinfo{pages}{2704--2705} (\bibinfo{year}{2006}).

\bibitem{aster2018parameter}
\bibinfo{author}{Aster, R.~C.}, \bibinfo{author}{Borchers, B.} \&
  \bibinfo{author}{Thurber, C.~H.}
\newblock \emph{\bibinfo{title}{Parameter estimation and inverse problems}}
  (\bibinfo{publisher}{Elsevier}, \bibinfo{year}{2018}).

\bibitem{ashyraliyev2009systems}
\bibinfo{author}{Ashyraliyev, M.}, \bibinfo{author}{Fomekong-Nanfack, Y.},
  \bibinfo{author}{Kaandorp, J.~A.} \& \bibinfo{author}{Blom, J.~G.}
\newblock \bibinfo{journal}{\bibinfo{title}{Systems biology: parameter
  estimation for biochemical models}}.
\newblock {\emph{\JournalTitle{The FEBS journal}}}
  \textbf{\bibinfo{volume}{276}}, \bibinfo{pages}{886--902}
  (\bibinfo{year}{2009}).

\bibitem{ding2014combined}
\bibinfo{author}{Ding, F.}
\newblock \bibinfo{journal}{\bibinfo{title}{Combined state and least squares
  parameter estimation algorithms for dynamic systems}}.
\newblock {\emph{\JournalTitle{Applied Mathematical Modelling}}}
  \textbf{\bibinfo{volume}{38}}, \bibinfo{pages}{403--412}
  (\bibinfo{year}{2014}).

\bibitem{myung2003tutorial}
\bibinfo{author}{Myung, I.~J.}
\newblock \bibinfo{journal}{\bibinfo{title}{Tutorial on maximum likelihood
  estimation}}.
\newblock {\emph{\JournalTitle{Journal of mathematical Psychology}}}
  \textbf{\bibinfo{volume}{47}}, \bibinfo{pages}{90--100}
  (\bibinfo{year}{2003}).

\bibitem{bavdekar2011identification}
\bibinfo{author}{Bavdekar, V.~A.}, \bibinfo{author}{Deshpande, A.~P.} \&
  \bibinfo{author}{Patwardhan, S.~C.}
\newblock \bibinfo{journal}{\bibinfo{title}{Identification of process and
  measurement noise covariance for state and parameter estimation using
  extended kalman filter}}.
\newblock {\emph{\JournalTitle{Journal of Process control}}}
  \textbf{\bibinfo{volume}{21}}, \bibinfo{pages}{585--601}
  (\bibinfo{year}{2011}).

\bibitem{lillacci2010parameter}
\bibinfo{author}{Lillacci, G.} \& \bibinfo{author}{Khammash, M.}
\newblock \bibinfo{journal}{\bibinfo{title}{Parameter estimation and model
  selection in computational biology}}.
\newblock {\emph{\JournalTitle{PLoS Comput Biol}}}
  \textbf{\bibinfo{volume}{6}}, \bibinfo{pages}{e1000696}
  (\bibinfo{year}{2010}).

\bibitem{pirgazi2018robust}
\bibinfo{author}{Pirgazi, J.} \& \bibinfo{author}{Khanteymoori, A.~R.}
\newblock \bibinfo{journal}{\bibinfo{title}{A robust gene regulatory network
  inference method base on kalman filter and linear regression}}.
\newblock {\emph{\JournalTitle{PloS one}}} \textbf{\bibinfo{volume}{13}},
  \bibinfo{pages}{e0200094} (\bibinfo{year}{2018}).

\bibitem{zeng2011hybrid}
\bibinfo{author}{Zeng, N.}, \bibinfo{author}{Wang, Z.}, \bibinfo{author}{Li,
  Y.}, \bibinfo{author}{Du, M.} \& \bibinfo{author}{Liu, X.}
\newblock \bibinfo{journal}{\bibinfo{title}{A hybrid ekf and switching pso
  algorithm for joint state and parameter estimation of lateral flow
  immunoassay models}}.
\newblock {\emph{\JournalTitle{IEEE/ACM Transactions on Computational Biology
  and Bioinformatics}}} \textbf{\bibinfo{volume}{9}}, \bibinfo{pages}{321--329}
  (\bibinfo{year}{2011}).

\bibitem{medvedev2019oscillations}
\bibinfo{author}{Medvedev, A.}, \bibinfo{author}{Zhusubaliyev, Z.~T.},
  \bibinfo{author}{Ros{\'e}n, O.} \& \bibinfo{author}{Silva, M.~M.}
\newblock \bibinfo{journal}{\bibinfo{title}{Oscillations-free pid control of
  anesthetic drug delivery in neuromuscular blockade}}.
\newblock {\emph{\JournalTitle{Computer methods and programs in biomedicine}}}
  \textbf{\bibinfo{volume}{171}}, \bibinfo{pages}{119--131}
  (\bibinfo{year}{2019}).

\bibitem{tennoe2018uncertainpy}
\bibinfo{author}{Tenn{\o}e, S.}, \bibinfo{author}{Halnes, G.} \&
  \bibinfo{author}{Einevoll, G.~T.}
\newblock \bibinfo{journal}{\bibinfo{title}{Uncertainpy: a python toolbox for
  uncertainty quantification and sensitivity analysis in computational
  neuroscience}}.
\newblock {\emph{\JournalTitle{Frontiers in neuroinformatics}}}
  \textbf{\bibinfo{volume}{12}}, \bibinfo{pages}{49} (\bibinfo{year}{2018}).

\bibitem{chatzi2009unscented}
\bibinfo{author}{Chatzi, E.~N.} \& \bibinfo{author}{Smyth, A.~W.}
\newblock \bibinfo{journal}{\bibinfo{title}{The unscented kalman filter and
  particle filter methods for nonlinear structural system identification with
  non-collocated heterogeneous sensing}}.
\newblock {\emph{\JournalTitle{Structural Control and Health Monitoring: The
  Official Journal of the International Association for Structural Control and
  Monitoring and of the European Association for the Control of Structures}}}
  \textbf{\bibinfo{volume}{16}}, \bibinfo{pages}{99--123}
  (\bibinfo{year}{2009}).

\bibitem{raue2009structural}
\bibinfo{author}{Raue, A.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Structural and practical
  identifiability analysis of partially observed dynamical models by exploiting
  the profile likelihood}}.
\newblock {\emph{\JournalTitle{Bioinformatics}}} \textbf{\bibinfo{volume}{25}},
  \bibinfo{pages}{1923--1929} (\bibinfo{year}{2009}).

\bibitem{raue2015data2dynamics}
\bibinfo{author}{Raue, A.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Data2dynamics: a modeling
  environment tailored to parameter estimation in dynamical systems}}.
\newblock {\emph{\JournalTitle{Bioinformatics}}} \textbf{\bibinfo{volume}{31}},
  \bibinfo{pages}{3558--3560} (\bibinfo{year}{2015}).

\bibitem{banga2008optimization}
\bibinfo{author}{Banga, J.~R.}
\newblock \bibinfo{journal}{\bibinfo{title}{Optimization in computational
  systems biology}}.
\newblock {\emph{\JournalTitle{BMC systems biology}}}
  \textbf{\bibinfo{volume}{2}}, \bibinfo{pages}{1--7} (\bibinfo{year}{2008}).

\bibitem{mendoncca2009drug}
\bibinfo{author}{Mendon{\c{c}}a, T.}, \bibinfo{author}{Lemos, J.~M.},
  \bibinfo{author}{Magalhaes, H.}, \bibinfo{author}{Rocha, P.} \&
  \bibinfo{author}{Esteves, S.}
\newblock \bibinfo{journal}{\bibinfo{title}{Drug delivery for neuromuscular
  blockade with supervised multimodel adaptive control}}.
\newblock {\emph{\JournalTitle{IEEE Transactions on Control systems
  technology}}} \textbf{\bibinfo{volume}{17}}, \bibinfo{pages}{1237--1244}
  (\bibinfo{year}{2009}).

\bibitem{ali2017optimal}
\bibinfo{author}{Ali, N.}, \bibinfo{author}{Zaman, G.} \&
  \bibinfo{author}{Alshomrani, A.~S.}
\newblock \bibinfo{journal}{\bibinfo{title}{Optimal control strategy of hiv-1
  epidemic model for recombinant virus}}.
\newblock {\emph{\JournalTitle{Cogent Mathematics}}}
  \textbf{\bibinfo{volume}{4}}, \bibinfo{pages}{1293468}
  (\bibinfo{year}{2017}).

\bibitem{aastrom1995pid}
\bibinfo{author}{H{\"a}gglund, T.}
\newblock \emph{\bibinfo{title}{PID controllers: theory, design, and tuning}},
  vol.~\bibinfo{volume}{2}.

\bibitem{tan2006comparison}
\bibinfo{author}{Tan, W.}, \bibinfo{author}{Liu, J.}, \bibinfo{author}{Chen,
  T.} \& \bibinfo{author}{Marquez, H.~J.}
\newblock \bibinfo{journal}{\bibinfo{title}{Comparison of some well-known pid
  tuning formulas}}.
\newblock {\emph{\JournalTitle{Computers \& chemical engineering}}}
  \textbf{\bibinfo{volume}{30}}, \bibinfo{pages}{1416--1423}
  (\bibinfo{year}{2006}).

\bibitem{de2012specifications}
\bibinfo{author}{De~Keyser, R.}, \bibinfo{author}{Dutta, A.},
  \bibinfo{author}{Hernandez, A.} \& \bibinfo{author}{Ionescu, C.~M.}
\newblock \bibinfo{title}{A specifications based pid autotuner}.
\newblock In \emph{\bibinfo{booktitle}{2012 IEEE International Conference on
  Control Applications}}, \bibinfo{pages}{1621--1626}
  (\bibinfo{organization}{IEEE}, \bibinfo{year}{2012}).

\bibitem{lewis2012optimal}
\bibinfo{author}{Lewis, F.~L.}, \bibinfo{author}{Vrabie, D.} \&
  \bibinfo{author}{Syrmos, V.~L.}
\newblock \emph{\bibinfo{title}{Optimal control}} (\bibinfo{publisher}{John
  Wiley \& Sons}, \bibinfo{year}{2012}).

\bibitem{khalili2019derivation}
\bibinfo{author}{Khalili, P.} \& \bibinfo{author}{Vatankhah, R.}
\newblock \bibinfo{journal}{\bibinfo{title}{Derivation of an optimal trajectory
  and nonlinear adaptive controller design for drug delivery in cancerous tumor
  chemotherapy}}.
\newblock {\emph{\JournalTitle{Computers in biology and medicine}}}
  \textbf{\bibinfo{volume}{109}}, \bibinfo{pages}{195--206}
  (\bibinfo{year}{2019}).

\bibitem{cunningham2018optimal}
\bibinfo{author}{Cunningham, J.~J.}, \bibinfo{author}{Brown, J.~S.},
  \bibinfo{author}{Gatenby, R.~A.} \& \bibinfo{author}{Sta{\v{n}}kov{\'a}, K.}
\newblock \bibinfo{journal}{\bibinfo{title}{Optimal control to develop
  therapeutic strategies for metastatic castrate resistant prostate cancer}}.
\newblock {\emph{\JournalTitle{Journal of theoretical biology}}}
  \textbf{\bibinfo{volume}{459}}, \bibinfo{pages}{67--78}
  (\bibinfo{year}{2018}).

\bibitem{engelhart2011optimal}
\bibinfo{author}{Engelhart, M.}, \bibinfo{author}{Lebiedz, D.} \&
  \bibinfo{author}{Sager, S.}
\newblock \bibinfo{journal}{\bibinfo{title}{Optimal control for selected cancer
  chemotherapy ode models: a view on the potential of optimal schedules and
  choice of objective function}}.
\newblock {\emph{\JournalTitle{Mathematical Biosciences}}}
  \textbf{\bibinfo{volume}{229}}, \bibinfo{pages}{123--134}
  (\bibinfo{year}{2011}).

\bibitem{dutta2012switched}
\bibinfo{author}{Dutta, A.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Switched nonlinear predictive
  control with adaptive references for engagement of wet clutches}}.
\newblock {\emph{\JournalTitle{IFAC Proceedings Volumes}}}
  \textbf{\bibinfo{volume}{45}}, \bibinfo{pages}{460--465}
  (\bibinfo{year}{2012}).

\bibitem{chen2012optimal}
\bibinfo{author}{Chen, T.}, \bibinfo{author}{Kirkby, N.~F.} \&
  \bibinfo{author}{Jena, R.}
\newblock \bibinfo{journal}{\bibinfo{title}{Optimal dosing of cancer
  chemotherapy using model predictive control and moving horizon
  state/parameter estimation}}.
\newblock {\emph{\JournalTitle{Computer methods and programs in biomedicine}}}
  \textbf{\bibinfo{volume}{108}}, \bibinfo{pages}{973--983}
  (\bibinfo{year}{2012}).

\bibitem{dutta2016robust}
\bibinfo{author}{Dutta, A.}, \bibinfo{author}{Ionescu, C.},
  \bibinfo{author}{Loccufier, M.} \& \bibinfo{author}{De~Keyser, R.}
\newblock \bibinfo{journal}{\bibinfo{title}{Robust penalty adaptive model
  predictive control (pampc) of constrained, underdamped, noncollocated
  systems}}.
\newblock {\emph{\JournalTitle{Journal of Vibration and Control}}}
  \textbf{\bibinfo{volume}{22}}, \bibinfo{pages}{549--558}
  (\bibinfo{year}{2016}).

\bibitem{dutta2014comparison}
\bibinfo{author}{Dutta, A.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Comparison of two-level nmpc and
  ilc strategies for wet-clutch control}}.
\newblock {\emph{\JournalTitle{Control Engineering Practice}}}
  \textbf{\bibinfo{volume}{22}}, \bibinfo{pages}{114--124}
  (\bibinfo{year}{2014}).

\bibitem{zurakowski2006model}
\bibinfo{author}{Zurakowski, R.} \& \bibinfo{author}{Teel, A.~R.}
\newblock \bibinfo{journal}{\bibinfo{title}{A model predictive control based
  scheduling method for hiv therapy}}.
\newblock {\emph{\JournalTitle{Journal of Theoretical Biology}}}
  \textbf{\bibinfo{volume}{238}}, \bibinfo{pages}{368--382}
  (\bibinfo{year}{2006}).

\bibitem{sharifi2017multiple}
\bibinfo{author}{Sharifi, N.}, \bibinfo{author}{Ozgoli, S.} \&
  \bibinfo{author}{Ramezani, A.}
\newblock \bibinfo{journal}{\bibinfo{title}{Multiple model predictive control
  for optimal drug administration of mixed immunotherapy and chemotherapy of
  tumours}}.
\newblock {\emph{\JournalTitle{Computer methods and programs in biomedicine}}}
  \textbf{\bibinfo{volume}{144}}, \bibinfo{pages}{13--19}
  (\bibinfo{year}{2017}).

\bibitem{dutta2014model}
\bibinfo{author}{Dutta, A.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{Model-based and model-free learning
  strategies for wet clutch control}}.
\newblock {\emph{\JournalTitle{Mechatronics}}} \textbf{\bibinfo{volume}{24}},
  \bibinfo{pages}{1008--1020} (\bibinfo{year}{2014}).

\bibitem{tyanova2016perseus}
\bibinfo{author}{Tyanova, S.} \emph{et~al.}
\newblock \bibinfo{journal}{\bibinfo{title}{The perseus computational platform
  for comprehensive analysis of (prote) omics data}}.
\newblock {\emph{\JournalTitle{Nature methods}}} \textbf{\bibinfo{volume}{13}},
  \bibinfo{pages}{731} (\bibinfo{year}{2016}).

\end{thebibliography}
